-- Database: def-view-and-func

-- DROP DATABASE IF EXISTS "def-view-and-func";

CREATE DATABASE "def-view-and-func"
    WITH
    OWNER = dbuser01
    ENCODING = 'UTF8'
    LC_COLLATE = 'en_US.utf8'
    LC_CTYPE = 'en_US.utf8'
    TABLESPACE = pg_default
    CONNECTION LIMIT = -1
    IS_TEMPLATE = False;
